iff2ps ( 1 ) USER COMMANDS iff2ps ( 1 )

NAME

iff2ps – IFF to PostScript filter

SYNTAX

iff2ps [ options ] [ IFFfile [ PSfile ] ]

DESCRIPTION The iff2ps command takes an IFF ILBM file as input and produces a PostScript file that may be e P sent to a PostScript printer (e.g., an Apple LaserWriter) for printing. The image portion in th ostScript file is compressed. Decompression is done by the PostScript interpreter within the o printer. If no files are given on the command line, the standard input is read, and the standard utput is written to. If only one file is given on the command line, then that file must be an t fi IFF file, and the standard output is written to. Note that you cannot specify a PostScript outpu led have standard input read. The output file conforms to the Adobe 2.0 file structuring T conventions. The options may appear before or after the file nam es.

he program correctly handles any ILBM format. Specifically, the image in the IFF file can be r any size, can have any number of bitplanes, and all CAMG view modes are supported (i.e., low esolution, high resolution, interlace, HAM, double playfield, and HALFBRITE). However, it p is noted that currently double playfield files are not printed quite correctly since both fie lds are rinted on top of each other.

The following options may be used to control the formatting of the image. e – a Append output to a previously produced PostScript file. This options allows th placement of multiple images on the same output page. The default is FALSE. y – cn Number of copies. The practical upper limit on the number of copies is governed b the number of sheets which the printer paper tray will hold. If you want multiple s i copies of the same image, use this option instead of running iff2ps multiple times a t is orders of magnitude faster. The deau lt value is 1. . – – e This option enables echoing of the translation progress. The default is FALSE

f Use this option if the output file if to be encapsulated and used by some other appli- – cation which can import PostScript images. The default is FALSE.

gn Number of gray shades to be used in the half-toned image. There are only four pos- , t sible values for the number of gray shades: 2, 4, 16, 256. If this option is omitted he next number greater than or equal to the number of colors in the IFF file will be d used. For exam ple: a 320 by 200 pixel by 5 bit planes (32 colors) picture would efault to 256 gray shades while a 640x400x4 (16 color) image would default to 16 e w gray shades. If an image contains a pure white color, it will be rendered as pur hite in the half-toned print. To obtain a half-toned white (99 percent of pure . S white) instead of pure white, enter the number of gray shades as a negative number pecial effects (and sm aller output files) can be obtained by choosing fewer gray l r shades than the numbers of colors in the original picture. Choosing 2 shades wil esult in a high contrast image while choosing 4 shades for a picture with greater – than 4 colors will result in a posterized effect.

n Negative image. Can be used with any number of gray shades. Thee fault is – FALSE.

p The image is printed in portrait mode if this option is selected. The default is – FALSE in which case the image is printed in landscape mode.

rn This option specifies the rotation angle. The image is rotated n degrees counter- – clockwise. The default is 0 degrees.

sn,– tn These options specify the x and y coordinate scales in printer Points (72 Points = 1 g inch). The defaults are 0, in which case the scales are automatically chosen so as to ive the largest image for the current format.

1

i

Sun Release 3.5 Last change: October 31, 1988

ff2ps ( 1 ) USER COMMANDS iff2ps ( 1 )

– xn,– yn These options enable thelac ement of the coordinate origin at a specified location given in printer Points. The defaults are such as to give a centered image on the ? page regardless of the current format.

This option will echo the command format to the screen. g w Defaults for all command line arguments can be specified in the configu ration file iff2ps.cfich should be placed in S:. If iff2ps is run and a configuration file exists, then it is read to e c set up the program ’s defaults. Switches on the command line, though, will always override th onfigu ration switches. The configu ration file consists of lines in which the initial character in a s each line specifies the command. If the initial character is a space, an asterisk, a pound sign, emicolon, or a line feed, the line is ignored. This makes it useful for commenting the file. d White space following the command is optional. Comments can also be placed on the indiviual lines after the complete command is specified.

DIAGNOSTICS If the IFF ILBM file makes use of a specific Amiga view mode such as HAM, HALFBRITE, or m dual playfield, a CAMG chunk should be present in the file. If it is not present, then iff2ps ust guess the the view mode. In most circumstances iff2ps will make the right guess and d b echo ‘‘No CAMG chunk! Guessing ViewModes.’’ to the screen. If such files were generate y a commercial program , the user is highly encouraged to contact the distributor of the e software product and complain about the improper IFF file generated. Only through such fforts can we hope to see better software on the Amiga.

BUGS

Dual playfield files are printed incorrectly. Both fie lds are printed on top of each other without

FILES masking.

iff2ps.cfg configu ration file

SEE ALSO

tek2ps( 1)

COPYRIGH T Copyright (c) 1987, 1988 William Mason and Sam uel Paolucci. All rights reserved. This pro- n gram can be freely redistributed provided the documentation accompanies the program , and is ot included with any commercial software without the authors’ written consent. This program is distributed WITHOUT ANY WARRANTY. S AUTHOR

William Mason and Sam uel Paolucci. Special thanks to Tomas Rokicki for allowing us to use

S his PostScript compression routine.

un Release 3.5 Last change: October 31, 1988 2